Ave Maria By Bach-Gounod for Piano and French Horn

- Pure Sheet Music By Lars Christian Lundholm.

ABOUT:

By Bach/Gounod this is one of the most lyrical piece in classical music. The melody by Charles Gounod is superimposed over the Prelude No. 1 in C major, BWV 846 by J.S. Bach. Composed in 1853 it is often performed at weddings, Christmas time and funerals and famously recorded by Luciano Pavarotti and Mario Lanza

Sheet Music for French Horn accompanied by Piano arranged by Lars Christian Lundholm.

Ave Maria By Bach-Gounod is also known by alternative title: Meditation sur le Premier Prelude de Piano de S. Bach, Ave Maria, BWV 846.

Instrumentation: Piano and French Horn

Level: Easy

Score Type: Score and 1 Part

Tempo: Slow

Genre: Romantic

Composer: Charles Francois Gounod

Year Composed: 1853

Please return to purchase more sheet music for Piano and French Horn, for instance:

Daisy Bell for Piano and French Horn

The Wild Rover for Piano and French Horn

Aura Lee for Piano and French Horn

Habanera from Carmen for Piano and French Horn

Jesu Joy of Man's Desiring for Piano and French Horn

Home on the Range for Piano and French Horn

Bill Bailey for Piano and French Horn

COPYRIGHT:

Puresheetmusic is the first and leading seller of sheet music as ebooks worldwide including iTunes.

Puresheetmusic has been number 1 on the iTunes arts and entertainment best seller book chart in more than a dozen countries including:

United Kingdom

Germany

Australia

We would be delighted if you share this sheet music with everyone you know (after all it is just a demo)..

Copyright 2015 Puresheetmusic

Pure Sheet Music Edition